% $Id$ %
\def\UseOption{rgnano}
\edef\UseOption{\UseOption,RG_NANO_PAD}
\edef\UseOption{\UseOption,HAVE_BACKLIGHT}
\edef\UseOption{\UseOption,rgnano}

\newcommand{\playerman}{Anbernic}
\newcommand{\playertype}{RG Nano}
\newcommand{\playerlongtype}{\playertype}
\newcommand{\dapdisplaywidth}{240}
\newcommand{\dapdisplayheight}{240}
\newcommand{\dapdisplaydepth}{16}
\newcommand{\specimg}{rgnano}
%Used to name the player, e.g. ...to the \dap
\newcommand{\dap}{handheld}
%For use when referring to the player. E.g. the \daps\ capacity ...
\newcommand{\daps}{handheld's}
\newcommand{\firmwarefilename}{\fname{rockbox_funkey-s.opk}}
\newcommand{\firmwareextension}{\fname{opk}}
\newcommand{\screenshotsize}{8cm}
\newcommand{\disk}{SD card}

% link external keymap file
\input{platform/keymap-rgnano.tex}
