\subsection{Battery\_test}
\begin{figure}[h]
\begin{center}
%\includegraphics{plugins/images/\platform/ss_battery_test.png}
\end{center}
\caption{Battery Test}
\end{figure}

This plugin simulates normal power drain by spinning up the disk and
reading a big file once every 90 seconds (or thereabouts). Each
spin up also writes the battery level to a
log file. The test stops when battery level reaches 4\% in order to
avoid being unable to write to the disk.  The power usage data is saved
to a file in the root directory of the Jukebox.  This plugin can
sometimes be useful for diagnosing problems with battery charging.

